Como Iniciar

A applet de controle do 3dfx Tools pode ser acedida a partir do Painel de controle do Windows.

Clique no botão Iniciar  do Windows, seleccione Configurações e então clique em Painel de controle.

Dê um duplo clique no ícone 3dfx Tools.


Como Obter Ajuda

Existe ajuda on-line disponível, que pode ser acedida pressionando-se a tecla F1 dentro da página de controle do 3dfx Tools.  Isto acederá as informações de ajuda gerais de controle do 3dfx Tools.

 O conteúdo completo da ajuda pode ser acedido a partir da ajuda on-line ou clicando no botão Ajuda da applet de controle do 3dfx Tools. Isto disponibiliza informações para qualquer consulta relacionada ao 3dfx Tools.


Para uma Ferramenta Específica

Existe ajuda on-line disponível para cada ferramenta individual, que pode ser acedida pressionando-se a tecla F1 de dentro de qualquer uma das páginas de controle da ferramenta.  Isto chamará informações de ajuda sobre a página atual.


Como Remover o 3dfx Tools

Para remover o 3dfx Tools do sistema:

Feche todos os programas.

Clique no botão Iniciar  do Windows, seleccione Configurações e então clique em Painel de controle.

Dê um duplo clique no ícone Adicionar ou remover programas.

Siga as instruções na tela.

Você precisa reiniciar o computador para completar a remoção do 3dfx Tools.


Página de Controle do 3dfx Tools

Esta é a página de controle geral do 3dfx Tools.

A página de controle contém uma lista de todas as ferramentas actualmente instaladas, permitindo que o usuário ative ou desactive essas ferramentas conforme desejado.

Se mais de um acelerador gráfico estiver instalado, as ferramentas podem ser activadas ou desactivadas para cada placa em particular.


Como Activar ou Desactivar uma Ferramenta

Para activar ou desactivar uma ferramenta:

Seleccione o acelerador gráfico para o qual você deseja activar ou desactivar a ferramenta.

Marque ou desmarque a caixa de selecção da ferramenta, conforme a acção desejada.

Clique no botão OK ou Aplicar se desejar efectivar as mudanças.

Se desejar não efectivar as alterações, clique em Cancelar.

As páginas de controle das ferramentas desactivadas não serão exibidas na applet de controle do 3dfx Tools nem na página de Configurações Avançadas.


Sobre o 3dfx Tools

A caixa Sobre do 3dfx Tools pode ser acedida clicando-se com o botão esquerdo do mouse a barra de título da applet de controle do 3dfx Tools e seleccionando-se Sobre o 3dfx Tools.

A caixa Sobre contém informações de versão.